11 0 1 0.00789 15 1 1 0.00686 9 2 1 0.00440 8 3 1 0.00425 7 4 1 0.00416 6 5 1 0.00419 5 6 1 0.00405 4 7 1 0.00394 3 8 1 0.00421 0 9 1 0.00415 20 0 2 0.00840 18 1 2 0.00648 12 2 2 0.00468 12 3 2 0.00464 10 4 2 0.00466 3 5 2 0.00345 2 6 2 0.00330 1 7 2 0.00321 7 8 2 0.00420 0 9 2 0.00360 24 0 3 0.00836 17 1 3 0.00556 14 2 3 0.00491 13 3 3 0.00501 12 4 3 0.00470 0 5 3 0.00253 0 6 3 0.00259 0 7 3 0.00263 8 8 3 0.00411 0 9 3 0.00302 21 0 4 0.00716 16 1 4 0.00541 17 2 4 0.00600 21 3 4 0.00652 13 4 4 0.00473 0 5 4 0.00252 0 6 4 0.00244 0 7 4 0.00265 6 8 4 0.00396 0 9 4 0.00306 15 0 5 0.00576 10 1 5 0.00483 24 2 5 0.00892 54 3 5 0.0177 11 4 5 0.00509 0 5 5 0.00284 0 6 5 0.00282 0 7 5 0.00270 5 8 5 0.00407 0 9 5 0.00342 8 0 6 0.00450 52 1 6 0.0170 111 2 6 0.0314 290 3 6 0.168 12 4 6 0.00559 0 5 6 0.00281 0 6 6 0.00253 0 7 6 0.00245 1 8 6 0.00339 1 9 6 0.00384 1 0 7 0.00344 42 1 7 0.0177 184 2 7 0.0455 261 3 7 0.252 37 4 7 0.0120 7 5 7 0.00442 0 6 7 0.00301 0 7 7 0.00248 3 8 7 0.00422 11 9 7 0.00545 35 0 8 0.0200 42 1 8 0.0282 218 2 8 0.0721 432 3 8 0.235 77 4 8 0.0908 15 5 8 0.00552 6 6 8 0.00377 0 7 8 0.00322 12 8 8 0.00638 22 9 8 0.00809 39 0 9 0.0188 31 1 9 0.0152 836 2 9 0.214 799 3 9 0.206 166 4 9 0.0762 29 5 9 0.0129 48 6 9 0.0225 38 7 9 0.0231 34 8 9 0.0128 5 9 9 0.00470 51 0 10 0.0255 60 1 10 0.0298 547 2 10 0.284 797 3 10 0.235 186 4 10 0.138 678 5 10 0.194 497 6 10 0.137 360 7 10 0.0935 42 8 10 0.0219 8 9 10 0.00530 6 0 11 0.00592 23 1 11 0.0120 536 2 11 0.234

2110 3 11 0.537

1768 4 11 0.424 744 5 11 0.220 382 6 11 0.0926 114 7 11 0.0390 17 8 11 0.00916 0 9 11 0.00270 0 0 12 0.00296 35 1 12 0.0120 87 2 12 0.0261 148 3 12 0.0470 153 4 12 0.0479 94 5 12 0.0315 39 6 12 0.0126 21 7 12 0.00778 4 8 12 0.00403 0 9 12 0.00332 9 0 13 0.00540 19 1 13 0.00660 32 2 13 0.0106 40 3 13 0.0123 38 4 13 0.0115 26 5 13 0.00877 14 6 13 0.00539 7 7 13 0.00442 5 8 13 0.00403 0 9 13 0.00285 7 0 14 0.00484 15 1 14 0.00587 29 2 14 0.00958 28 3 14 0.0104 23 4 14 0.00911 12 5 14 0.00545 6 6 14 0.00398 3 7 14 0.00314 3 8 14 0.00354 0 9 14 0.00340