Planar sundial for these parameters:

The line perpendicular to its plane points at:

azimuth 173.9 degrees,

angular height 0.0 degrees,

The latitude of the place is 49.3 degrees

The local time is 0.0 min ahead of the shown time

(SunDial /? would give you help.)

7

8

9

10

11

11

12

12

13

13

14

15

16

17